Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Implementing Decision (EU) 2018/136 of 25 January 2018 designating the European Union reference laboratory for foot-and-mouth disease and amending Annex II to Council Directive 92/119/EEC as regards the European Union reference laboratory for swine vesicular disease (notified under document C(2018) 299) (Text with EEA relevance. ).