Article 1
In accordance with Article 3(2) of Decision 2000/258/EC, the following laboratory is authorised to perform the serological tests to monitor the effectiveness of rabies vaccines in dogs, cats and ferrets:
Laboratory for Rabies of the Veterinary Institute
Faculty of Veterinary Medicine
Lazar Pop-Trajkov 5-7
1000 Skopje
The former Yugoslav Republic of Macedonia.