Implementation
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Council Decision (CFSP) 2018/653 of 26 April 2018 on the establishment of a warehouse capability for civilian crisis-management missions.