ANNEX II

DEMARCATED AREAS AND MEASURES, AS PROVIDED FOR IN ARTICLE 5
Section 1

Establishment and amendment of demarcated areas
(1). . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
(2)

The infested zone shall include the places where the specified organism has been found to be present.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
(3)

A buffer zone of a width of at least 500 m shall be established around the infested zone. However, that buffer zone shall only include water courses and areas that are saturated with fresh water.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
(4). . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
(5). . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
(6). . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Section 2

Measures in demarcated areas, as provided for in the second subparagraph of Article 5(1)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Decision revoked (31.12.2020) by The Plant Health (Amendment etc.) (EU Exit) Regulations 2020 (S.I. 2020/1482), reg. 2(2)(b), Sch. 3 para. 16 (with regs. 53, 55)