Commission Implementing Decision
of 5 November 2012
on the harmonisation of the frequency bands 1 920-1 980 MHz and 2 110-2 170 MHz for terrestrial systems capable of providing electronic communications services in the Union
(notified under document C(2012) 7697)
(Text with EEA relevance)
(2012/688/EU) (revoked)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Decision revoked (31.12.2020) by The Radio Spectrum (EU Exit) Regulations 2018 (S.I. 2018/1385), Sch. 2 para. 28; 2020 c. 1, Sch. 5 para. 1(1)

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX PARAMETERS REFERRED TO IN ARTICLE 2(1)

A. DEFINITIONS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

B. GENERAL PARAMETERS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

C. TECHNICAL CONDITIONS FOR BASE STATIONS – BLOCK EDGE MASK
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

D. TECHNICAL CONDITIONS FOR TERMINAL STATIONS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .