CHAPTER II

PROCEDURES FOR INVESTIGATIONS

Duration
Article 8
1
The Commission shall adopt the report referred to in Article 7 no later than 10 months after notification of its decision to initiate an investigation according to Article 2. In exceptional cases, where the investigations are obstructed or where the acquisition of the information necessary for the investigations involves excessively long procedures, the Commission may extend the deadline by five months.
2
The inspections shall be completed within six months of the starting date of the inspection. In exceptional cases, where the inspections are obstructed or where the acquisition of the information in connection with the inspections involves excessively long procedures, the Commission may extend the deadline by three months.