Article 1
Directive 2004/17/EC shall not apply to contracts awarded by contracting entities and intended to enable the production and wholesale of electricity produced from conventional sources to be carried out in the macro-zone south of Italy.
Directive 2004/17/EC shall continue to apply to contracts awarded by contracting entities and intended to enable production and wholesale of electricity produced from renewable sources to be carried out in the macro-zone south of Italy.