Article 1
Article 5 of Decision 2011/72/CFSP is replaced by the following:
Article 5
This Decision shall apply until 31 January 2013. It shall be kept under constant review. It may be renewed or amended, as appropriate, if the Council deems that its objectives have not been met.
.