Article 4
The Commission shall monitor the functioning of this Decision and report any pertinent findings to the Committee established under Article 31 of Directive 95/46/EC, including any evidence that could affect the finding in Article 1 of this Decision, that protection in the Eastern Republic of Uruguay is adequate within the meaning of Article 25 of Directive 95/46/EC and any evidence that this Decision is being implemented in a discriminatory way.