Article 1
1
The EUR 3 billion recapitalisation, the EUR 10 billion guarantee granted by Germany to HSH in the form of a risk shield and the liquidity guarantees granted by Germany constitute state aid caught by Article 107(1) of the Treaty on the Functioning of the European Union.
2
The aid in the form of a EUR 3 billion recapitalisation, a EUR 10 billion guarantee granted by Germany to HSH in the form of a risk shield and the liquidity guarantees granted by Germany are compatible with the internal market, in light of the commitments set out in Annexes I and III and subject to compliance with the conditions set out in in Annex II.