Article 2
1
The maximum overall contribution authorised by this Decision for the costs incurred for the programmes referred to in Article 1 is set at EUR 3 307 803 to be financed from the general budget of the European Union.
2
Expenditure relating to staff costs for performing laboratory tests, sampling, monitoring, consumables and overheads dedicated to the surveillance studies shall be eligible in accordance with the rules set out in Annex III.
3
The Union’s financial assistance shall be paid following presentation and approval of the reports and supporting documents referred to Article 3(2) and (3).