Article 3
Individual aid granted under the scheme referred to in Article 1 which, at the time it was granted, met the conditions laid down in a regulation adopted pursuant to Article 1 of Regulation (EC) No 994/98 or under another approved aid scheme is compatible with the internal market up to the maximum aid intensities that apply to that type of aid.