Article 1
In accordance with Article 3(2) of Decision 2000/258/EC, the following laboratories are authorised to perform the serological tests to monitor the effectiveness of rabies vaccines in dogs, cats and ferrets:
1. Croatian Veterinary Institute
Laboratory for rabies and general virology
Savska cesta 143
Zagreb 10000
Croatia;
2. Centro Nacional de Servicios de Diagnóstico en Salud Animal
Km 37.5 Carretera Federal México — Pachuca
55740 Tecámac
México.