Article 1
The national provisions on certain fluorinated greenhouse gases, which the Kingdom of Denmark notified to the Commission by letter, dated 13 February 2012, and which are more stringent than Regulation (EC) No 842/2006 with respect to the placing on the market of products and equipment containing, or whose functioning relies upon, F-gases, are hereby approved.