Article 1
Standard EN 60065:2002/A12:2011 ‘Audio, video and similar electronic apparatus — Safety requirements’ and standard EN 60950-1:2006/A12:2011 ‘Information technology equipment — Safety — Part 1: General requirements’ meet the general safety requirement of Directive 2001/95/EC for the risks they cover.