Article 1
The anti-dumping proceeding concerning imports of certain seamless pipes and tubes or iron or steel, excluding seamless pipes and steel of stainless steel, of circular cross-section, of an external diameter not exceeding 406,4 mm with a Carbon Equivalent Value (CEV) not excėeding 0,86 according to the International Institute of Welding (IIW) formula and chemical analysis originating in Belarus, currently falling within CN codes ex 7304 19 10, ex 7304 19 30, ex 7304 23 00, ex 7304 29 10, ex 7304 29 30, ex 7304 31 80, ex 7304 39 58, ex 7304 39 92, ex 7304 39 93, ex 7304 51 89, ex 7304 59 92 and ex 7304 59 93, is hereby terminated.
The CEV shall be determined in accordance with Technical Report, 1967, IIW doc. IX-535-67, published by the International Institute of Welding (IIW).