Article 2
1
Greece shall take all measures necessary to recover from its beneficiaries the incompatible aid referred to in Article 1, which was granted unlawfully.
2
The aid to be recovered shall include interest calculated from the date on which it was placed at the disposal of the beneficiaries until the date of its recovery.
3
The interest shall be calculated on a compound basis in accordance with Chapter V of Commission Regulation (EC) No 794/2004 .
4
Recovery shall be effected without delay in accordance with the procedures provided for in national law, provided that they allow the immediate and effective execution of this Decision.
OJ L 140, 30.4.2004, p. 1.