Application and Interpretation
Article 2
1.
The BAT conclusions referred to in Article 1 apply in the United Kingdom.
2.
In this Decision—
- “
BAT conclusions
” has the meaning given in Article 2 of Decision 2012/134/EU (“Decision 2012/134/EU”) establishing the best available techniques (BAT) conclusions under Directive 2010/75/EU of the European Parliament and of the Council on industrial emissions for the manufacture of glass;
- “
best available techniques
” has the meaning given in Article 2 of Decision 2012/134/EU.
Art. 2 substituted (31.12.2020) by The Air Quality (Miscellaneous Amendment and Revocation of Retained Direct EU Legislation) (EU Exit) Regulations 2018 (S.I. 2018/1407), regs. 1, 7(2); 2020 c. 1, Sch. 5 para. 1(1)