Article 4
The HR shall report to the Council on the implementation of this Decision on the basis of regular quarterly reports prepared by Saferworld. Those reports shall form the basis for the evaluation carried out by the Council. The Commission shall report on the financial aspects of the implementation of the projects and measures referred to in Article 1(2).