Article 2
As of the date of this Decision, the rescue aid facility which Denmark granted to TV2 and which was authorised by the Commission in its decision of 4 August 2008 shall be repealed. None of the other aid measures notified by Denmark to the Commission on 4 February 2009 may be implemented.