Article 1
Subject to full compliance with the restructuring plan as notified on 4 February 2009 and to the conditions set out in Articles 2, 3 and 4, the facility which Denmark granted to TV2 and which was authorised as rescue aid by the Commission in its decision of 4 August 2008 is compatible with the internal market.