Article 5 Addressees
This Decision is addressed to the following undertakings:
ABCR Dr Braunagel GmbH & Co. (DE)
Im Schlehert 10
76187 Karlsruhe
Germany
Aesica Queenborough Ltd
North Street
Queenborough
Kent ME11 5EL
United Kingdom
Airbus Operations SAS
Route de Bayonne 316
31300 Toulouse
France
Albany Molecular Research (UK) Ltd
Mostyn Road
Holywell
Flintshire CH8 9DN
United Kingdom
Albemarle Europe SPRL
Parc Scientifique Einstein
Rue du Bosquet 9
1348 Louvain-la-Neuve
Belgium
ALFA Agricultural Supplies SA
73, Ethnikis Antistasseos Str,
152 31 Chalandri,
Athens
Greece
Arkema France SA
420, rue d’Estienne D’Orves
92705 Colombes Cedex
France
Arkema Quimica SA
Avenida de Burgos 12
28036 Madrid
Spain
Ateliers Bigata SAS
10, rue Jean Baptiste Perrin,
33320 Eysines Cedex
France
BASF Agri Production SAS
32 rue de Verdun
76410 Saint-Aubin lès Elbeuf
France
Bayer Crop Science AG
Gebäude A729
41538 Dormagen
Germany
Dow Deutschland Anlagengesellschaft mbH
Bützflether Sand
21683 Stade
Germany
DuPont de Nemours (Nederland) BV
Baanhoekweg 22
3313 LA Dordrecht
Netherlands
Dyneon GmbH
Werk Gendorf
Industrieperkstrasse 1
84508 Burgkirchen
Germany
Eras Labo
222 D1090
38330 Saint Nazaire les Eymes
France
Eusebi Impianti SRL
Via Mario Natalucci 6
60131 Ancona
Italy
Eusebi Service SRL
Via Vincenzo Pirani 4
60131 Ancona
Italy
Fire Fighting Enterprises Ltd
9 Hunting Gate,
Hitchin SG4 0TJ
United Kingdom
Fujifilm Electronic Materials (Europe) NV
Keetberglaan 1A
Haven 1061
2070 Zwijndrecht
Belgium
Halon & Refrigerants Services Ltd
J. Reid Trading Estate
Factory Road, Sandycroft
Deeside, Flintshire CH5 2QJ
United Kingdom
Harp International Ltd
Gellihirion Industrial Estate
Rhondda, Cynon Taff
Pontypridd CF37 5SX
United Kingdom
Honeywell Fluorine Products Europe B.V.
Laarderhoogtweg 18
1101 EA Amsterdam
Netherlands
Honeywell Specialty Chemicals GmbH
Wunstorfer Strasse 40
Postfach 100262
30918 Seelze
Germany
Hovione Farmaciencia SA
Sete Casas
2674-506 Loures
Portugal
ICL-IP Europe B.V.
Fosfaatweeg 48
1013 BM Amsterdam
Netherlands
Laboratorios Miret SA
Geminis 4,
08228 Terrassa, Barcelona
Spain
LGC Standards GmbH
Mercatorstr. 51
46485 Wesel
Germany
LPG Tecnicas en Extinción de Incendios SL
C/Mestre Joan Corrales 107-109
08950 Esplugas de Llobregat, Barcelona
Spain
Mebrom NV
Assenedestraat 4
9940 Rieme Ertvelde
Belgium
Merck KgaA
Frankfurter Strasse 250
64271 Darmstadt
Germany
Mexichem UK Ltd
PO Box 13
The Heath
Runcorn Cheshire WA7 4QX
United Kingdom
Ministry of Defence
Defence Fuel Lubricants and Chemicals
PO Box 10.000
1780 CA Den Helder
Netherlands
Panreac Quimica S.L.U.
Pol. Ind. Pla de la Bruguera, C/Garraf 2
08211 Castellar del Vallès-Barcelona
Spain
Poż-Pliszka Sp. z o.o.
ul. Szczecińska 45
80-392 Gdańsk
Poland
R.P. Chem SRL
Via San Michele 47
31062 Casale sul Sile (TV)
Italy
Safety Hi-Tech SRL
Via Cavour 96
67051 Avezzano (AQ)
Italy
Savi Technologie Sp. z o.o.
Ul. Wolnosci 20
Psary
51-180 Wroclaw
Poland
Sicor SRL
Via Terazzano 77
20017 Rho
Italy
Sigma Aldrich Chemie GmbH
Riedstrasse 2
89555 Steinheim
Germany
Sigma Aldrich Chimie SARL
80, rue de Luzais
L’isle d’abeau Chesnes
38297 St Quentin Fallavier
France
Sigma Aldrich Company Ltd
The Old Brickyard, New Road
Gillingham SP8 4XT
United Kingdom
Solvay Fluor GmbH
Hans-Böckler-Allee 20
30173 Hannover
Germany
Solvay Fluores France
25 rue de Clichy
75442 Paris
France
Solvay Specialty Polymers France SAS
Avenue de la Republique
39501 Tavaux Cedex
France
Solvay Solexis SpA
Viale Lombardia 20
20021 Bollate (MI)
Italy
Sterling SRL
Via della Carboneria 30
06073 Solomeo di Corciano (PG)
Italy
Syngenta Crop Protection
Surrey Research Park
30 Priestly Road
Guildford Surrey GU2 7YH
United Kingdom
Tazzetti SpA
Corso Europa n. 600/a
10070 Volpiano (TO)
Italy
TEGA Technische Gase und Gastechnik GmbH
Werner-von-Siemens-Strasse 18
97076 Würzburg
Germany
Thomas Swan & Co. Ltd
Rotary Way
Consett
County Durham DH8 7ND
United Kingdom
Total Feuerschutz GmbH
Industriestr 13
68526 Ladenburg
Germany