Article 1
The Annex to Decision 2002/364/EC is amended in accordance with...
Article 2
This Decision shall apply from 1st of July 2012. However,...
Article 3
This Decision is addressed to the Member States.
ANNEX
1.
The following section is added at the end of Section...
2.
The following table is added at the end of the...
Commission Decision
of 20 December 2011
amending Decision 2002/364/EC on common technical specifications for in vitro diagnostic medical devices
(notified under document C(2011) 9398)
(Text with EEA relevance)
(2011/869/EU)
THE EUROPEAN COMMISSION,
Having regard to the Treaty on the Functioning of the European Union,
Having regard to Directive 98/79/EC of the European Parliament and of the Council of 27 October 1998 on in vitro diagnostic medical devices , and in particular the second subparagraph of Article 5(3) thereof,
Whereas:
(1)
The common technical specifications for in vitro diagnostic medical devices are laid down in Commission Decision 2002/364/EC .
(2)
In the interest of public health it is appropriate, where possible, to draw up common technical specifications for the devices listed in List A of Annex II to Directive 98/79/EC.
(3)
Variant Creutzfeldt-Jakob disease (vCJD) assays for blood screening, diagnosis and confirmation have been added to List A of Annex II to Directive 98/79/EC by Commission Directive 2011/100/EU .
(4)
Taking into account the state of the art and the current scientific knowledge on Variant Creutzfeldt-Jakob disease, common technical specifications can be drawn up for vCJD blood screening assays.
(5)
The measures provided for in this Decision are in accordance with the opinion of the committee set up by Article 6(2) of Council Directive 90/385/EEC and referred to in Article 7(1) of Directive 98/79/EC,
HAS ADOPTED THIS DECISION:
OJ L 331, 7.12.1998, p. 1.
OJ L 131, 16.5.2002, p. 17.
See page 50 of this Official Journal.
OJ L 189, 20.7.1990, p. 17.