Article 1
The anti-dumping proceeding concerning imports of polyethylene terephthalate having a viscosity number of 78 ml/g or higher, according to the ISO Standard 1628-5, originating in Oman and Saudi Arabia, currently falling within CN code 3907 60 20, is hereby terminated.