Council Decision 2011/782/CFSP
of 1 December 2011
concerning restrictive measures against Syria and repealing Decision 2011/273/CFSP (repealed)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Council Decision 2012/739/CFSP of 29 November 2012 concerning restrictive measures against Syria and repealing Decision 2011/782/CFSP.