Article 1
Article 16(1) of Joint Action 2008/124/CFSP is hereby replaced by the following:
1.
The financial reference amount intended to cover the expenditure of EULEX KOSOVO until 14 October 2010 shall be EUR 265 000 000.
The financial reference amount intended to cover the expenditure of EULEX KOSOVO from 15 October 2010 until 14 December 2011 shall be EUR 165 000 000.
The financial reference amount intended to cover the expenditure of EULEX KOSOVO from 15 December 2011 until 14 June 2012 shall be EUR 72 800 000.
.