Conditions concerning the transport of semen to Great Britain
Article 3
1
The semen and stocks of semen referred to in Article 2 shall not be transported in the same container as other consignments of semen that:
a
are not intended for introduction into Great Britain; or
b
are of a lower health status.
2
During transport to Great Britain, semen and stocks of semen shall be placed in closed and sealed containers and the seal shall not be broken during transport.
Words in Art. 3 substituted (31.12.2020) by The Import of, and Trade in, Animals and Animal Products (Miscellaneous Amendments) (EU Exit) Regulations 2020 (S.I. 2020/1462), regs. 1(3), 60(4) (with regs. 69-71)