Article 4
1
Germany shall withdraw the scheme referred to in Article 1.
2
Germany shall recover the incompatible aid granted under the scheme referred to in Article 1 from the beneficiaries.
3
The sums to be recovered shall bear interest from the date on which they were made available to the beneficiaries until their actual recovery.
4
The interest shall be calculated on a compound basis in accordance with Chapter V of Commission Regulation (EC) No 794/2004 .
5
Germany shall cancel all outstanding payments of aid under the scheme referred to in Article 1 with effect from the date of notification of this Decision.
OJ L 140, 30.4.2004, p. 1.