Commission Implementing Decision
of 16 August 2011
concerning certain protection measures relating to classical swine fever in Lithuania
(notified under document C(2011) 5798)
(Text with EEA relevance)
(2011/508/EU) (repealed)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by 2011/546/EU: Commission Implementing Decision of 16 September 2011 repealing Implementing Decision 2011/508/EU concerning certain protection measures relating to classical swine fever in Lithuania (notified under document C(2011) 6443) Text with EEA relevance.