Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by 2011/546/EU: Commission Implementing Decision of 16 September 2011 repealing Implementing Decision 2011/508/EU concerning certain protection measures relating to classical swine fever in Lithuania (notified under document C(2011) 6443) Text with EEA relevance.