Article 1
1
The State aid which the Federal Republic of Germany is planning to implement for Deutsche Solar AG, amounting to EUR 40 364 760 in discounted value, corresponding to an aid intensity of 12,97 % GGE, is compatible with the internal market within the meaning of Article 107(3)(a) of the Treaty on the Functioning of the European Union.
2
Implementation of the aid amounting to EUR 40 364 760 in discounted value, corresponding to an aid intensity of 12,97 % GGE, is accordingly authorised.