Article 1
In Part A of Annex XI to Directive 2003/85/EC, the entry for Spain is replaced by the following:
ES | Spain | - Laboratorio Central de Sanidad Animal, Algete, Madrid - Centro de Investigación en Sanidad Animal (CISA), Valdeolmos, Madrid | Spain