Article 1
In Article 26 of Decision 2010/413/CFSP, the following paragraph is added:
4.
The measures referred to in Article 19(1)(b), in so far as they apply to Mr Ali Akbar Salehi, shall be suspended.
.
Article 2
The persons and entities listed in Annex I to this Decision shall be added to the list set out in Annex II to Decision 2010/413/CFSP.
Article 3
In Annex II to Decision 2010/413/CFSP, the entries for the following persons and entities:
1. Mr Ali Akbar Salehi;
2. Iran Centrifuge Technology Company (aka TSA or TESA);
3. Ministry of Defence and Support for Armed Force Logistics (MODAFL);
4. Research Institute of Nuclear Science and Technology (aka Nuclear Science and Technology Research Institute),
shall be replaced by the entries set out in Annex II to this Decision.
Article 4
This Decision shall enter into force on the date of its adoption.