Article 8 Physical security
1. Physical security is the application of physical and technical protective measures to prevent unauthorised access to EUCI.
2. Physical security measures shall be designed to deny surreptitious or forced entry by an intruder, to deter, impede and detect unauthorised actions and to allow for segregation of personnel in their access to EUCI on a need-to-know basis. Such measures shall be determined based on a risk management process.
3. Physical security measures shall be put in place for all premises, buildings, offices, rooms and other areas in which EUCI is handled or stored, including areas housing communication and information systems as defined in Article 10(2).
4. Areas in which EUCI classified CONFIDENTIEL UE/EU CONFIDENTIAL or above is stored shall be established as Secured Areas in accordance with Annex II and approved by the competent security authority.
5. Only approved equipment or devices shall be used for protecting EUCI at the level CONFIDENTIEL UE/EU CONFIDENTIAL or above.
6. Provisions for implementing this Article are set out in Annex II.