Article 5 Security risk management
1. Risk to EUCI shall be managed as a process. This process shall be aimed at determining known security risks, defining security measures to reduce such risks to an acceptable level in accordance with the basic principles and minimum standards set out in this Decision and at applying these measures in line with the concept of defence in depth as defined in Appendix A. The effectiveness of such measures shall be continuously evaluated.
2. Security measures for protecting EUCI throughout its life-cycle shall be commensurate in particular with its security classification, the form and the volume of the information or material, the location and construction of facilities housing EUCI and the locally assessed threat of malicious and/or criminal activities, including espionage, sabotage and terrorism.
3. Contingency plans shall take account of the need to protect EUCI during emergency situations in order to prevent unauthorised access, disclosure or loss of integrity or availability.
4. Preventive and recovery measures to minimise the impact of major failures or incidents on the handling and storage of EUCI shall be included in business continuity plans.