Appendices
Appendix D

LIST OF ABBREVIATIONS
Acronym | Meaning
AQUA | Appropriately Qualified Authority
BPS | Boundary Protection Services
CAA | Crypto Approval Authority
CCTV | Closed Circuit Television
CDA | Crypto Distribution Authority
CFSP | Common Foreign and Security Policy
CIS | Communication and Information Systems handling EUCI
COREPER | Committee of Permanent Representatives
CSDP | Common Security and Defence Policy
DSA | Designated Security Authority
ECSD | European Commission Security Directorate
EUCI | EU Classified Information
EUSR | EU Special Representative
FSC | Facility Security Clearance
GSC | General Secretariat of the Council
IA | Information Assurance
IAA | Information Assurance Authority
IDS | Intrusion Detection System
IT | Information Technology
NSA | National Security Authority
PSC | Personnel Security Clearance
PSCC | Personnel Security Clearance Certificate
PSI | Programme/Project Security Instructions
SAA | Security Accreditation Authority
SAB | Security Accreditation Board
SAL | Security Aspects Letter
SecOPs | Security Operating Procedures
SCG | Security Classification Guide
SSRS | System-Specific Security Requirement Statement
TA | TEMPEST Authority