Article 3 Individual aid granted under the scheme referred to in Article 1 which, at the time it is granted, fulfils the conditions laid down by a regulation adopted pursuant to Article 1 of Regulation (EC) No 994/98 or by any other approved aid scheme, shall be compatible with the internal market, up to the maximum aid intensities applicable to this type of aid.