CHAPTER IV

NEW ENTRANTS AND CLOSURES

Application for free allocation
Article 17. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Activity levels
Article 18. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Allocation to new entrants
Article 19. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Allocation as new entrant following a significant capacity extension
Article 20. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Significant capacity reduction
Article 21. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Cessation of operations of an installation
Article 22. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Partial cessation of operations of an installation
Article 23. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Changes to the operation of an installation
Article 24. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Decision revoked (1.1.2024) by Retained EU Law (Revocation and Reform) Act 2023 (c. 28), ss. 1(1), 22(3), Sch. 1 Pt. 2 (with s. 1(3)(4)); S.I. 2023/1363, reg. 2