CHAPTER II

INCUMBENT INSTALLATIONS

Identification of installations
Article 5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Division into sub-installations
Article 6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Baseline data collection
Article 7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Verification
Article 8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Historical activity level
Article 9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Allocation at installation level
Article 10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Allocation in respect of steam cracking
Article 11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Allocation in respect of vinyl chloride monomer
Article 12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heat flows between installations
Article 13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Exchangeability of fuel and electricity
Article 14. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Decision revoked (1.1.2024) by Retained EU Law (Revocation and Reform) Act 2023 (c. 28), ss. 1(1), 22(3), Sch. 1 Pt. 2 (with s. 1(3)(4)); S.I. 2023/1363, reg. 2