Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Regulation (EU) No 1304/2014 of 26 November 2014 on the technical specification for interoperability relating to the subsystem ‘rolling stock — noise’ amending Decision 2008/232/EC and repealing Decision 2011/229/EU (Text with EEA relevance).