CHAPTER II

COMPOSITION AND VALUATION RULES FOR THE BALANCE SHEET

Synthetic instruments
Article 12 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Decision (EU) 2016/2247 of the European Central Bank of 3 November 2016 on the annual accounts of the European Central Bank (ECB/2016/35) (recast).