Article 1
- Ms Mary G. BAKER, born in London (United Kingdom) on 27 October 1936,
- Mr Mike O'DONOVAN, born in London (United Kingdom) on 26 September 1946,
- Ms Lisette TIDDENS-ENGWIRDA, born in Amsterdam (Netherlands) on 25 June 1950
and
- Mr Henk VAARKAMP, born in Terschuur (Netherlands) on 22 June 1950,
are hereby appointed members of the Management Board of the European Medicines Agency (EMEA) for a period of three years.