Article 2
By way of derogation from Article 2 of Regulation (EEC) No 3220/84, pig carcases may be presented also without forefeet before being weighed and graded. In this case, in order to establish quotations for pig carcases on a comparable basis, the recorded hot weight shall be increased by 0,840 kilograms.