Article 1
Annex C to Directive 64/432/EEC is replaced by the text in the Annex to this Decision.
Article 2
Article 1 of Decision 2004/226/EC is replaced by the following:
Article 1
The complement fixation test, the buffered Brucella antigen test (rose Bengal test (RBT)), the ELISA tests and the fluorescence polarisation assay (FPA) carried out in accordance with Annex C to Directive 64/432/EEC are hereby approved for certification purposes.
Article 3
This Decision is addressed to the Member States.
Done at Brussels, 10 December 2008.
For the Commission
Androulla Vassiliou
Member of the Commission