Article 4
Article 3 of Decision 2005/344/EC is replaced by the following:
Article 3
The ecological criteria for the product group “all purpose cleaners and cleaners for sanitary facilities”, as well as the related assessment and verification requirements, shall be valid until 31 December 2010.