Article 1
The State aid which Germany is planning to implement for DHL is incompatible with the common market to the extent of EUR 6 175 198.
The rest of the State aid, amounting to EUR 1 578 109, which Germany is planning to implement for DHL is compatible with the common market pursuant to Article 87 of the EC Treaty.