Article 1
The 4 % shareholding in OTE that the Greek State is planning to transfer to TAP-OTE, provided that its value does not exceed, on the day of the transfer, the amount of EUR 390,4 million, constitutes aid which is compatible with the common market within the meaning of Article 87(3)(c).
Should the value of the 4 % shareholding of OTE that the Greek State is planning to transfer to TAP-OTE exceed, on the date of the transfer, the amount of EUR 390,4 million, Greece shall take all necessary measures to ensure that TAP-OTE will not receive any amount in excess of EUR 390,4 million.