ANNEX DIRECTIVE 96/48/EC — INTEROPERABILITY OF THE TRANS-EUROPEAN HIGH SPEED RAIL SYSTEM
TECHNICAL SPECIFICATION FOR INTEROPERABILITY
‘Rolling stock’ Sub-System

4. CHARACTERISTICS OF THE SUBSYSTEM

4.2. Functional and technical specification of the subsystem

4.2.7. System protection

4.2.7.2. Fire safety

4.2.7.2.1. Introduction

category B Fire safety
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Regulation (EU) No 1302/2014 of 18 November 2014 concerning a technical specification for interoperability relating to the ‘rolling stock — locomotives and passenger rolling stock’ subsystem of the rail system in the European Union (Text with EEA relevance).