Article 1
1
The ad hoc state aid which the Netherlands has granted to the NOS for the functions it performs as PO is incompatible with the common market.
2
The incompatible ad hoc state aid shall be recovered from the NOS. The amount to be recovered is €76,327 million, plus interest.
3
The ad hoc state aid granted by the Netherlands to the individual public service broadcasters is compatible with the common market provided that, insofar as such aid results in over-compensation of the public service mission, the surplus is held in a special purpose reserve, the amount of which does not exceed 10 % of the broadcaster's annual budget and provided that compliance with this limitation is regularly monitored by the Netherlands.