Article 1 1. The ad hoc state aid which the Netherlands has granted to the NOS for the functions it performs as PO is incompatible with the common market.
2. The incompatible ad hoc state aid shall be recovered from the NOS. The amount to be recovered is €76,327 million, plus interest.
3. The ad hoc state aid granted by the Netherlands to the individual public service broadcasters is compatible with the common market provided that, insofar as such aid results in over-compensation of the public service mission, the surplus is held in a special purpose reserve, the amount of which does not exceed 10 % of the broadcaster's annual budget and provided that compliance with this limitation is regularly monitored by the Netherlands.